\hypertarget{structmmal__worker__lmk}{}\section{mmal\+\_\+worker\+\_\+lmk Struct Reference}
\label{structmmal__worker__lmk}\index{mmal\+\_\+worker\+\_\+lmk@{mmal\+\_\+worker\+\_\+lmk}}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structmmal__worker__lmk_ae92f1e55100c39744ba8f34172fa3cae}{}\hyperlink{structmmal__worker__msg__header}{mmal\+\_\+worker\+\_\+msg\+\_\+header} {\bfseries header}\label{structmmal__worker__lmk_ae92f1e55100c39744ba8f34172fa3cae}

\item 
\hypertarget{structmmal__worker__lmk_a01b1d6f9f71fc51b92186ef2dd4914ab}{}uint32\+\_\+t {\bfseries alloc\+\_\+size}\label{structmmal__worker__lmk_a01b1d6f9f71fc51b92186ef2dd4914ab}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/\+Volumes/\+W\+O\+R\+K\+\_\+\+I\+N\+\_\+\+P\+R\+O\+G\+R\+E\+S\+S/\+R\+A\+S\+P\+B\+E\+R\+R\+Y\+\_\+\+P\+I/github/firmware-\/master/opt/vc/include/interface/mmal/vc/\hyperlink{mmal__vc__msgs_8h}{mmal\+\_\+vc\+\_\+msgs.\+h}\end{DoxyCompactItemize}
