\hypertarget{structmmal__worker__component__disable}{}\section{mmal\+\_\+worker\+\_\+component\+\_\+disable Struct Reference}
\label{structmmal__worker__component__disable}\index{mmal\+\_\+worker\+\_\+component\+\_\+disable@{mmal\+\_\+worker\+\_\+component\+\_\+disable}}


{\ttfamily \#include $<$mmal\+\_\+vc\+\_\+msgs.\+h$>$}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmmal__worker__component__disable_a9bf39afdc704e6c6de40756c9f6a41d8}\label{structmmal__worker__component__disable_a9bf39afdc704e6c6de40756c9f6a41d8}} 
\mbox{\hyperlink{structmmal__worker__msg__header}{mmal\+\_\+worker\+\_\+msg\+\_\+header}} {\bfseries header}
\item 
uint32\+\_\+t \mbox{\hyperlink{structmmal__worker__component__disable_a9dd40cbb0f3c1d7b2b877689d2a38a64}{component\+\_\+handle}}
\end{DoxyCompactItemize}


\subsection{Detailed Description}
Disable a component 

\subsection{Member Data Documentation}
\mbox{\Hypertarget{structmmal__worker__component__disable_a9dd40cbb0f3c1d7b2b877689d2a38a64}\label{structmmal__worker__component__disable_a9dd40cbb0f3c1d7b2b877689d2a38a64}} 
\index{mmal\+\_\+worker\+\_\+component\+\_\+disable@{mmal\+\_\+worker\+\_\+component\+\_\+disable}!component\+\_\+handle@{component\+\_\+handle}}
\index{component\+\_\+handle@{component\+\_\+handle}!mmal\+\_\+worker\+\_\+component\+\_\+disable@{mmal\+\_\+worker\+\_\+component\+\_\+disable}}
\subsubsection{\texorpdfstring{component\+\_\+handle}{component\_handle}}
{\footnotesize\ttfamily uint32\+\_\+t mmal\+\_\+worker\+\_\+component\+\_\+disable\+::component\+\_\+handle}

Which component 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/\+Volumes/\+W\+O\+R\+K\+\_\+\+I\+N\+\_\+\+P\+R\+O\+G\+R\+E\+S\+S/\+R\+A\+S\+P\+B\+E\+R\+R\+Y\+\_\+\+P\+I/firmware-\/master/opt/vc/include/interface/mmal/vc/\mbox{\hyperlink{mmal__vc__msgs_8h}{mmal\+\_\+vc\+\_\+msgs.\+h}}\end{DoxyCompactItemize}
